Time (ms)

(p<0.05) param with fdr

Frequency (Hz)

0 200 400 600 3

5

7 9 11 13 15 17 19 21 23 26 28 32 35

Time (ms)

ITC - F7, target visual stim in switch to vision

0 200 400 600 3

5

7 9 11 13 15 17 19 21 23 26 28 32 35

Time (ms)

ITC - F7, target visual stim in focus vision

0 200 400 600 3

5

7 9 11 13 15 17 19 21 23 26 28 32 35 ITC

0.04

0.13

0.22

0.3